Title: Exp2
Course: مختبر فيزياء عامه 2 الشعبة 10 عملي

Q: 1-    The waveform display on the oscilloscope as shown in  figure: the scales of oscilloscope are  (5 ms/div in horizontal which represent the time  and  2 V/div in vertical which represents the Volt). Referring to the figure The voltage  Peak to Peak  V_p-p is:

[Image]
- 2 volt
- 3 volt
- 12 Volt
- 6 Volt
A: 12 Volt

Q: The waveform display on the oscilloscope is shown in the figure: the scales of oscilloscope are  (2 ms/div in horizontal which represent the time  and 5 V/div in vertical which represents the Volt). Referring to the figure The Frequency of the wave is:

[Image]
- 62.5 ms
- 2 ms
- 125 Hz
- 62.5 Hz
A: 125 Hz

Q: The waveform display on the oscilloscope is shown in the figure: the scales of oscilloscope are  (4 ms/div in horizontal which represent the time  and 5 V/div in vertical which represents the Volt). Referring to the figure The Frequency of the wave is:

[Image]
- 62.5 ms
- 2 ms
- 125 Hz
- 62.5 Hz
A: 62.5 Hz

Q: The waveform display on the oscilloscope is shown in the figure: the scales of oscilloscope are  (8 ms/div in horizontal which represent the time  and 5 V/div in vertical which represents the Volt). Referring to the figure The Frequency of the wave is:

[Image]
- 62.5 Hz
- 8 ms
- 125 Hz
- 31.25 Hz
A: 31.25 Hz

Q: 1-    The waveform display on the oscilloscope as shown in  figure: the scales of oscilloscope are  (5 ms/div in horizontal which represent the time  and  1 V/div in vertical which represents the Volt). Referring to the figure The voltage  Peak to Peak  V_p-p is:

[Image]
- 1 volt
- 3 volt
- 12 Volt
- 6 Volt
A: 6 Volt

Q: 1-    The waveform display on the oscilloscope as shown in  figure: the scales of oscilloscope are  (5 ms/div in horizontal which represent the time  and  0.5 V/div in vertical which represents the Volt). Referring to the figure The voltage  Peak to Peak  V_p-p is:

[Image]
- 0.5 volt
- 3 volt
- 12 Volt
- 6 Volt
A: 3 volt