Title: اختيار من متعدد
Course: مختبر فيزياء عامه 2 الشعبة 10 عملي

Q: [Image]
- Increase
- Decrease
- Remains the same
- None of the above
A: Increase

Q: [Image]
- 300 C
- 400 C
- 500 C
- 200 C
A: 400 C

Q: [Image]
- Decrease
- Increase
- NONE of the above
- Have no change
A: Increase

Q: [Image]
- 0.009 C^-1
- 0.0009 C^-1
- 0.9 C^-1
- 0.09 C^-1
A: 0.0009 C^-1

Q: [Image]
- Increase
- Decrease
- Non of the above
- Remains the same
A: Increase

Q: [Image]
- [Image]
- [Image]
- [Image]
- [Image]
A: [Image]