Title: اختيار من متعدد
Course: مختبر فيزياء عامه 2 الشعبة 10 عملي

Q: [Image]
- 871 V
- 5.15 V
- 0 V
- 0.194 V
A: 871 V

Q: [Image]
- R_1 <R_2 <R_3
- R1 >R2 >R3
- R1= R2 =R3
- R2 > R3 > R1
A: R_1 <R_2 <R_3

Q: [Image]
- 0.45 A
- 0.3 A
- 0.15 A
- 0.85 A
A: 0.45 A

Q: [Image]
- 0.1 A , 0.3 A
- 0.3 A, 0.1 A
- 0.15 A, 0.3A
- 0.3A, 0.15A
A: 0.1 A , 0.3 A

Q: [Image]
- Resistance increase
- Resistance decrease
- Potential difference increase
- Resistance remains the same.
A: Resistance decrease

Q: [Image]
- 8.5 A
- 24 A
- 10 A
- 12 A
A: 8.5 A