Title: 2. final
Course: مختبر فيزياء عامه 2 الشعبة 10 عملي

Q: Kh.11-2M. A student measures the horizontal component of the magnetic field of earth using he tangent galvanometer.

The value B_e may be obtained according to your results of the experiment is?
- 25 μ T
- 25 mT
- 50 mA
- 2.5 mT
A: 25 μ T